
                      %Function Keys - Interpreter Mode%


   Shift
   F1 : & Greek &       Remaps keyboard for Greek characters.

   F2 : & Last &        Recalls last statement entered.

   F3 : & Save &        Saves current line for later recall by F4.

   F4 : & Recall &      Recalls line saved with F3.

   F5 : & Program &     Activates programming mode.

   F6 : & Dos &         Activates command interpreter shell.

   F7 : & Help &        Activates this help package.
